<p>Mr. Wu(Wayne Wu), currently serving as a solutions engineering at NetApp Taiwan, has extensive experience in the IT field. He has worked as a technical engineer, senior project manager, and sales technical consultant in well-known companies in the healthcare and telecommunications industries. He holds professional certifications in VＭware, NetApp, AWS, ISO, and more.</p>

<p>Mr. Wu specializes in information system architecture integration, hybrid cloud environment deployment, information security, and data center design planning. He has successfully executed and assisted in implementing numerous practical projects, serving clients in various sectors, including government agencies, education, telecommunications, and healthcare. With a wealth of experience in optimizing information system performance and risk management in setup and operations, he is a consultant well-versed in both expertise and industry operations knowledge.</p>